Title: Quiz 6
Course: Risk Management Module > Section: Risk Management Module

This quiz is to be complete after you have watched Video 6 in the Risk Management Independent Learning Module.

Q: A hazard is:
- a source of potential harm.
- a description of how frequently an even occurs.
- the result of an event occurring.
- the product of probability and consequence.
A: a source of potential harm.

Q: Probability is:
- a description of how frequently an even occurs.
- a source of potential harm.
- the result of an event occurring.
- the product of probability and consequence.
A: a description of how frequently an even occurs.

Q: A consequence is:
- the result of an event occurring.
- a source of potential harm.
- a description of how frequently an even occurs.
- the product of probability and consequence.
A: the result of an event occurring.

Q: Risk is:
- the product of probability and consequence.
- the product of hazard and consequence.
- a description of how frequently an even occurs.
- the result of an event occurring.
A: the product of probability and consequence.