Title: Quiz 4
Course: Risk Management Module > Section: Risk Management Module

Q: The Bowtie Risk Assessment has:
- 2 parts:  identify threats and consequences
- 3 parts:  identify hazards, threats, and consequences
- 4 parts:  identify hazards, threats, consequences, and control measures
- 5 parts:  identify hazards, threats, consequences, control measures, and recovery measures
- 6 parts:  identify hazards, threats, consequences, control measures, recovery measures, and quantify risk
A: 5 parts:  identify hazards, threats, consequences, control measures, and recovery measures

Q: A company has had 10 slip and fall accidents in the workshop in the last year.  The accidents happen in an oil barrel storage area.  The most serious injury was a broken wrist.  What is the consequence of this type of accident?
- Minor - A very minor incident, no lost time
- Moderate - A lost time injury (short term)
- Possible - Likely to occur sometime in the life of the plant
- Certain - Likely to occur often during the life of the plant
A: Moderate - A lost time injury (short term)